From 79905ad50bcf025deb81382413719ed600734941 Mon Sep 17 00:00:00 2001
From: Paul Mackerras <paulus@samba.org>
Date: Tue, 1 Jun 2010 19:33:08 +0000
Subject: agp/uninorth: Fix oops caused by flushing too much

This fixes a sporadic oops at boot on G5 Power Macs.  The table_end
variable has the address of the last byte of the table.  Adding on
PAGE_SIZE means we flush too much, and if the page after the table
is not mapped for any reason, the kernel will oops.  Instead we add
on 1 because flush_dcache_range() interprets its second argument as
the first byte past the range to be flushed.

Signed-off-by: Paul Mackerras <paulus@samba.org>
Signed-off-by: Benjamin Herrenschmidt <benh@kernel.crashing.org>

diff --git a/drivers/char/agp/uninorth-agp.c b/drivers/char/agp/uninorth-agp.c
index 95db713..f845a8f 100644
--- a/drivers/char/agp/uninorth-agp.c
+++ b/drivers/char/agp/uninorth-agp.c
@@ -415,7 +415,7 @@ static int uninorth_create_gatt_table(struct agp_bridge_data *bridge)
 	bridge->gatt_table_real = (u32 *) table;
 	/* Need to clear out any dirty data still sitting in caches */
 	flush_dcache_range((unsigned long)table,
-			   (unsigned long)(table_end + PAGE_SIZE));
+			   (unsigned long)table_end + 1);
 	bridge->gatt_table = vmap(pages, (1 << page_order), 0, PAGE_KERNEL_NCG);
 
 	if (bridge->gatt_table == NULL)
-- 
cgit v0.10.2

